INSERT INTO !PREFIX!_phplib_auth_user_md5 VALUES('48a365b4ce1e322a55ae9017f3daf0c0', 'sysadmin', '48a365b4ce1e322a55ae9017f3daf0c0', 'sysadmin', 'Systemadministrator', 'sysadmin@IhreSite.de', '', '', '', '', '', '1', '1000-01-01', '1000-01-01', '1000-01-01 00:00:01', '', '0');